Sup er T AINS %K%e!<%9 No.4 J?@. 7 G/ 7 7n 31 F| 3 AppleT alk FC=89fH/4)$K$"$?$C$F T AINS MxMQ8&5f2q AppleT alk %0%k!<%W :G6a$N Macin tosh $d%M%C%H%o!< %/5!4o$NDc2A3J2=$KH<$$!$ T AINS $X$N Macin tosh $N@\ B3 $, 5^ 7c $K A} 2C $7 $F $* $j!$ T AINS $X $N EtherT alk $G $N @\ B3 $, 5q H] $5 $l $k 8= >] $d 0B 0W $J T AINS $X $N @\ B3 $K $h $k T AINS $G $N %H %i %V %k $, Aj <! $$ $G $* $j $^ $9!# $^ $?!$ 3X Fb 30 $N >p Js %M%C%H%o!< %/$N ?JJb $bCx $7 $$$b $N$, $"$j!$ $3 $N%M%C %H%o!< %/$r 2wE, $+ $DM- 8z$K 3hMQ $9 $k$? $a$K$b!$ %M%C%H %o!<%/ 4D 6-$N @0Hw!$ $=$7 $F E,@Z $J%M%C %H %o!<%/ 5!4o $N@_ Dj J}K! $N<~ CNE0 Dl $,I, MW ;k $5 $l $F $* $j!$ $3 $N $? $S Sup er T AINS %K%e!<%9 - AppleT alk FC =8 9f - $N H/ 4) $N 1? $S $H$J$j$^$7$?!# $5 $F T AINS Mx MQ 8& 5f 2q AppleT alk %0 %k!< %W $G $O Macin tosh $N T AINS $G $N 1_ 3j $J Mx MQ 4D 6- $r @0 Hw $9 $k $? $a $K!$ T AINS >e $G $N EtherT alk $N Net w ork Range $NJQ99 $r J?@. 7 G/ 8 7n 11 F| ( 6b ) $K 9T $$ $^ $9!# T AINS $r Mx MQ $7 $F $$ $k $9 $Y $F $N Macin tosh %f!< %6!$$J$i$S $K AppleT alk %5!< %S%9$r 9T$C$F $$$k unix $*$h $S router $J$I$N %M%C%H %o!<%/ 5! 4o$r 4I M} $7 $F $$ $k J} $O!$ 7G :\ 5- ;v (p.6) $r ;2 9M $K EtherT alk $N netw ork range $N JQ 99 $K BP =h$7$F2<$5$$!# $^ $?!$ $3 $N Sup er T AINS %K%e!< %9 -AppleT alk FC =8 9f - $K $O MacTCP , Eudora, F etc h, NCSA telnet $* $h $S Netscap e $N @_ Dj J} K! $d Macin tosh $G $N Mail Serv er $N N) $A >e $2 J} $J $I $r 7G :\ CW $7 $^ $7 $? $N $G!$ Macintosh $r T AINS $X @\ B3 $7 EE ;R %a!< %k $d WWW %5!< %P!< Ey$N%M%C %H%o!< %/;q 8;$r MxMQ $7 $?$$ $H9M $($F $$$k J}$O $< $RK\ 5-;v $r$4 Mw$K $J$C$F 2< $5$$!# $^$?!$ Macin tosh 0J30$N%f!<%6$b;29M$K$J$j$^$9$N$G!$0lFI$7$F$$$?$@$1$l$P9,$$$G$9!# $J $*!$ K\ %K%e!< %9 $K 7G :\ $5 $l $F $$ $k net w ork range $N JQ 99 $K H< $& Zone @_ Dj $K 4X $9 $k %k!<%k$O!$ $" $/$^ $G $b T AINS Mx MQ8& 5f 2q AppleT alk %0 %k!< %W$G :n @.$7 $? <+<g %k!< %k$G $" $j$^$9 $,!$ AppleT alk $N T AINS $G $N 1_3j $JMx MQ $r<B 8=$9 $k $?$a $K $b3’ MM$N $4 M}2r $H $46( NO$r$*4j$$CW$7$^$9!# ( 1sF# <i5- )